\documentclass[family=ptm,extraname=shortexample,footer=false]{kerntest}
\begin{document}
\begin{kerntable}
  \testkern{W}{-}{A}{-}{W} original \\
  \testkern{V}{-160}{A}{+160}{V} altered \\
\end{kerntable}
\end{document}
