      \skbem[code]{width}         & Set the width to be used with \cmd{resizebox} and \cmd{includegraphics}.
                                  \\
    \midrule
      \skbem[code]{height}        & Set the height to be used with \cmd{resizebox} and \cmd{includegraphics}.
                                  \\
    \midrule
      \skbem[code]{center}        & Use center environment.
                                  \\
    \midrule
      \skbem[code]{figure}        & Use figure environment.
                                  \\
    \midrule
      \skbem[code]{position}      & The position to be used within figure environment. This option will be ignored if not combined with \skbem[code]{figure}.
                                  \\
    \midrule
      \skbem[code]{caption}       & The caption to be used. Ignored if the option \skbem[code]{figure} is not used.
                                  \\
    \midrule
      \skbem[code]{label}         & The label to be used. Ignored if the option \skbem[code]{figure} is not used.
                                  \\
    \midrule
      \skbem[code]{multiinclide}  & The label to be used. Ignored if the option \skbem[code]{figure} is not used.
                                  \\