\mode
<presentation>

\begin{frame}{Configuration: Options}
  \label{start:config:opt}
  \begin{tabular*}{\textwidth}{ >{\scriptsize}p{.1\textwidth} >{\scriptsize}p{.65\textwidth} >{\scriptsize}p{.15\textwidth}}
    \skbinput[from=rep]{getting-started/config-opt-table}
  \end{tabular*}

\end{frame}




\mode
<article>

\resizebox{\textwidth}{!}{\includeslide{start:config:opt}}
\bigskip

\skbinput[from=rep]{getting-started/config-opt}

\clearpage

\mode
<all>
